-- Migration to change width and height from FLOAT to INT in image table
-- Run this after updating the Images model

-- First, backup the table (optional but recommended)
-- CREATE TABLE image_backup AS SELECT * FROM image;

-- Alter the columns to INT type
ALTER TABLE image MODIFY COLUMN width INT;
ALTER TABLE image MODIFY COLUMN height INT;

-- Verify the changes
DESCRIBE image;
